High Resolution X-ray Spectroscopy with XMM-Newton and Chandra, MSSL, 24–25 October 2002 5

Figure 4. Gallery of spectra, for a very diverse collection of cool stars. The Ne ix triplet lines (13.44, 13.55, 13.70 Å) are at the left, and Fe xvii, which has a similar emissivity distribution with temperature, is at the right (15.02 Å). Spectra have been ordered by relative strength of Ne ix to Fe xvii, a mainly abundance-dependent ratio.