fixedr_0.08_0.12_rep3.crc.last.ps fixedr_0.10_0.20_rep3.crc.last.ps

fixedr_0.15_0.25_rep3.crc.last.ps fixedr_0.20_0.30_rep3.crc.last.ps

fixedr_0.25_0.35_rep3.crc.last.ps fixedr_0.30_0.40_rep3.crc.last.ps

fixedr_0.35_0.45_rep3.crc.last.ps fixedr_0.40_0.50_rep3.crc.last.ps fixedr_0.45_0.55_rep3.crc.last.ps fixedr_0.50_0.60_rep3.crc.last.ps