%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% For support : Yolande Koh, <ykoh@wspc.com.sg>
%% Technical assistance : D. Rajesh Babu, <rajesh@wspc.com.sg>
%% Book Trim Size: 9in x 6in
%% Text Area: 7.35in (include runningheads) x 4.5in
%% Main Text: 10/13pt
%%
%% The content, structure, format and layout of this style file is
%% the property of World Scientific Publishing Co. Pte. Ltd.
%% Copyright 2007 by World Scientific Publishing Co.
%% All rights are reserved.
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%\documentclass[draft]{ws-book9x6}
\documentclass{ws-book9x6}

\usepackage{ws-book-van}           % Citation - 


\usepackage{subeqnarray}           %TEMP



  %ALSO need \bibliographystyle{ws-book-van}  at end

  %\title{My Book Title}              % set your book title here
  %
  %\makeindex

\begin{document}

  %\titlepages                        % pls. do not remove this line
  %
  %\begin{dedication}
  %\large Dedication Page \\[13pt]    % pls. input your dedication data here
  %\large (optional)
  %\end{dedication}
  %
  %\input preface.tex                 %\begin{preface}...\end{preface}
  %
  %%\input foreword.tex               %\begin{foreword}...\end{foreword}
  %
  %%\input acknowledgments.tex        %\begin{acknowledgments}...\end{acknowledgments}
  %
  %\tableofcontents
  %
  %%\listoffigures                    % optional list of figures
  %
  %%\listoftables                     % optional list of tables

\setcounter{page}{1}

%\part{First Part}{}               % optional divider page


\input aix-mci-chapter-final-trim.tex  %chapter1.tex


  %%\part{Second Part}{}              % optional divider page
  %
  %\input chapter2.tex
  %
  %\input chapter3.tex
  %
  %\input appendix.tex

% for BibTeX users
\bibliographystyle{unsrt} %[unsrt]  %{ws-book-van}[unsrt]    % Bibliography: Author-Date system
\bibliography{mci-refs}      % pls. call your database here

% for non-BibTeX users
%\input bibliography.tex

  %\printindex

\end{document}

%%% Local Variables: 
%%% mode: fundamental
%%% TeX-master: "File"
%%% End: 
